]^{-2}

[TeV 2Λ Wilson coefficient CI /

20− 15− 10− 5− 0 5 10 15 20

)σ Others Profiled (2 )σ Others Fixed to SM (2 )σ Others Profiled (1 )σ Others Fixed to SM (1 CMS Supplementary

(13 TeV) -1 41.5 fb